en	Ammonia-Based life Form

en	Doesn't Breathe

en	Advantage

en	Exotic

en	Physical

en	Gills

en	Gills

en	Suffocates in air

en	Oxygen Absorption

en	Oxygen Storage

en	Can hold breath 25 times as long as normal

en	Oxygen Storage

en	Can hold breath 50 times as long as normal

en	Oxygen Storage

en	Can hold breath 100 times as long as normal

en	Oxygen Storage

en	Can hold breath 200 times as long as normal

en	Oxygen Storage

en	Can hold breath 300 times as long as normal

en	Oxygen Combustion

en	Hydrogen-Breathing

en	Oxygen is Toxic and Corrosive

en	Strongly Alkaline

en	Exotic

en	Feature

en	Physical

en	Thermal Comfort Zone -82°F to -54°F

en	Exotic

en	Feature

en	Physical